
SET JAVA_HOME=@java_home@
SET ANT_HOME=@ant_home@
SET MVN_HOME=@mvn_home@

SET PORTAL_LOG=@esup.log.file@
SET PORTAL_LOG_DIR=@esup.log.dir@
SET TRUST_CERT=@esup.keystore@

SET CATALINA_HOME=@server.home@
SET CATALINA_BASE=%CATALINA_HOME%
SET CATALINA_TMPDIR=@server.temp@
SET CATALINA_OPTS=-Djavax.net.ssl.trustStore="%TRUST_CERT%"
SET CATALINA_PID=@server.temp@/uportal.pid

SET JAVA_OPTS=-server -XX:MaxPermSize=256m

@rem si debug distant : preciser le port avec JPDA_ADDRESS
@rem SET JPDA_ADDRESS=6665
@rem SET JPDA_TRANSPORT=dt_socket

@rem decommenter pour activer la console java
@rem voir http://java.sun.com/developer/technicalArticles/J2SE/jconsole.html
@rem et http://docs.oracle.com/javase/6/docs/technotes/guides/jmx/index.html
@rem ici, pour console locale
@rem SET JAVA_OPTS=%JAVA_OPTS% -Dcom.sun.management.jmxremote

@rem et la pour console distante, SANS SECU
@rem SET JAVA_OPTS=%JAVA_OPTS% -Dcom.sun.management.jmxremote.port=8888 -Dcom.sun.management.jmxremote.authenticate=false -Dcom.sun.management.jmxremote.ssl=false

@rem adapter JAVA_OPTS pour votre environnement : memoire utilisee, ....
@rem voir http://blogs.sun.com/watt/resource/jvm-options-list.html
@rem SET JAVA_OPTS=%JAVA_OPTS% -Dorg.apache.jasper.compiler.Parser.STRICT_QUOTE_ESCAPING=false

